1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

SANAE

2008

N64PCSA

620312.4 JAN 619816.9 FEB 617089.1 MAR 618486.2 APR 618753.5 MAY 621675.4 JUN 626642.3

JUL630736.1 AUG 632701.0

SEP631803.6 OCT 633841.1 NOV 624714.4