10.0 %

NEUTRON MONITOR

KIRUNA

1970

N64PCSA

648785.4 JAN 658843.9 FEB 657914.8 MAR APR 649926.4 MAY 635222.9 JUN 633086.1

JUL643107.9 AUG 654477.9

SEP658038.1 OCT 647743.5 NOV 664423.6 DEC 650029.7

10.0 %

NEUTRON MONITOR

KIRUNA

1971

N64PCSA

665279.2 JAN 675394.8 FEB 676653.9 MAR 675946.9 APR 682665.3 MAY 698690.8 JUN 701031.6

JUL704328.6 AUG 704805.2

SEP710562.0 OCT 709760.0 NOV 706311.6 DEC 692619.2

10.0 %

NEUTRON MONITOR

KIRUNA

1972

N64PCSA

701593.1 JAN 702598.7 FEB 711869.9 MAR 715961.5 APR 712789.7 MAY 700408.6 JUN 712343.1

JUL680544.7 AUG 709671.8

SEP711609.6 OCT 708729.8 NOV 710799.2 DEC 706576.6

10.0 %

NEUTRON MONITOR

KIRUNA

1973

N64PCSA

711450.6 JAN 711188.1 FEB 705180.8 MAR 689718.8 APR 681436.5 MAY 701017.2 JUN 705965.6

JUL710854.8 AUG 719878.8

SEP720795.1 OCT 719941.2 NOV 720847.9 DEC 708189.6

10.0 %

NEUTRON MONITOR

KIRUNA

1974

N64PCSA

719086.4 JAN 722688.2 FEB 713900.6 MAR 709541.3 APR 699171.6 MAY 692227.4 JUN 679268.4

JUL690798.5 AUG 684543.8

SEP685352.6 OCT 688299.4 NOV 700733.5 DEC 698801.0