1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

CLIMAX

1965

NPCSA

429419.2 JAN 428984.1 FEB 431426.5 MAR 433463.4 APR 434026.2 MAY 428873.1 JUN 424711.6

JUL424645.3 AUG 426758.3

SEP427051.0 OCT 429505.4 NOV 430027.1 DEC 429074.2