1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

HERMAN

1999

N64PCSA

421851.9 JAN 421569.5 FEB 422828.8 MAR 424101.2 APR 422853.1 MAY 427416.8 JUN 429084.9

JUL421172.8 AUG 415397.6

SEP413471.0 OCT 412195.8 NOV 409884.7 DEC 420152.3