1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

IRKUTS

2000

N64PCSA

728381.6 JAN 722520.8 FEB 713883.1 MAR 718386.8 APR 702315.2 MAY 684133.9 JUN 681181.4

JUL694878.1 AUG 702691.4

SEP715078.4 OCT 698508.1 NOV 704675.8 DEC 705552.9