1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

MT.NOR

2005

N64PCSA

2061080.6 JAN 2102808.0 FEB 2101394.5 MAR 2110683.2 APR 2127062.2 MAY 2157657.0 JUN 2149537.0

JUL2144807.5 AUG 2122878.5

SEP2163107.8 OCT 2148253.0 NOV 2138678.8 DEC 2127329.0