1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

ZUGSPI

1963

NPCSA

247156.5 JAN 249132.9 FEB 248271.5 MAR 247996.6 APR 248504.8 MAY 250851.1 JUN 252436.5

JUL249538.4 AUG 248855.4

SEP251154.4 OCT 248492.4 NOV 252487.0 DEC 249573.1