1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

KIEL

1970

N64PCSA

586294.4 JAN 592823.9 FEB 590605.9 MAR 582998.3 APR 583060.8 MAY 571631.0 JUN 571859.4

JUL580244.9 AUG 588462.9

SEP591527.7 OCT 583237.4 NOV 598511.9 DEC 585104.9