1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

TIBET_

2004

N64PCSA

10588137.0 JAN 10758321.0 FEB 10885881.0 MAR 10899976.0 APR 10947605.0 MAY 10915988.0 JUN 10851975.0

JUL10892071.0 AUG 10927932.0

SEP11031540.0 OCT 10919418.0 NOV 10921750.0 DEC 10878383.0