1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

HALEAK

2005

N64PCSA

3462297.0 JAN 3533009.0 FEB 3530574.0 MAR 3560618.0 APR 3541067.2 MAY 3562208.2 JUN 3546760.8

JUL3541985.2 AUG 3505423.5

SEP3559186.0 OCT 3569207.0 NOV 3567406.0 DEC 3539978.5