1234567891010111112121313141415151616171718181919202021212222232324242525262627272828292930303131MEAN

10.0 %

NEUTRON MONITOR

TIBET_

2005

N64PCSA

10733260.0 JAN 10910607.0 FEB 10924894.0 MAR 10980322.0 APR 10908692.0 MAY 10963870.0 JUN 10918587.0

JUL10879125.0 AUG 10814669.0

SEP11002064.0 OCT 11052883.0 NOV 11040768.0 DEC 10927478.0