Polar Cap Magnetic fields-IMF

-800

-80

-400

-40

0

0

400

40

800

80

Bx[nT]

Bs[nT]

0

0

By[nT] 0

0

Bz[nT] 0

0

Bd[nT]

0

0

0

0

Printed Thu Oct 13 18:19:47 1994