0.03.67.210.8tilt angle

ch.10.01

V0.03.67.210.814.4tilt angle ch.20.01

V21062206230600601060206030604060506846.5BG843.0557.7nm

BGcals(V)= cals(V)= cale(V)=

7.62

2.69

7.59

2.711820220246-100

0100200-100

010020010152025-100

01002002003001015202530 scan=

-74.88 ch.1(R) ch.2(R)

-37.44

0.00

37.44

74.88 BG1 BG2 (R/nm) DK1 DK2 (mV)

TP1TP2(C)(C)

Local Time (hour)

Tilting Photometer No.1 station=SGK

990121

557.7nm

846.5nm

843.0nm

-74.88

scanscan>0: southward

-37.44

0.00

37.44

74.88