0.00

7.20tilt angle

7.20

14.40

tilt angle

LT0.10

Vch.1:

486.1 nmch.2:

427.8 nmscan=

-74.88 scan=

74.88

1950 CAL 7.093

V4.766

V7.033

V4.796

V7.027

V4.774

V2020

2050

2120

2150

2220

2250

2320

2350

002000500120015002200250032003500420045005200550SHUT

486.1nm

485.1nm

427.8nm average:50mV

Tilting Photometer No.3 station=RIK

990121

01002003004001015202530 dark noise

(mV) temp (C) ch.1ch.21820220246-40481216-404812160408012004080120

485.1 nm (R)

427.8

Background (R/nm)

ch.1ch.2

Local Time (hour)

scan<0: northward